= KiCad GUI translations

This is the repository for the po files that is used for the GUI
translations for KiCad.

It is cmake equipped to conform with the rest of the installation
principles for KiCad.

== Depends
- Cmake
- Gettext

== How to install
```
cd kicad-i18n
cmake .
make
make install
```

If you want to change the default install prefix to match your KiCad
build, you can add for
example use `-DCMAKE_INSTALL_PREFIX=/usr`.
